-- cfm.cfg_0_5g_sitelevel definition

-- Drop table

-- DROP TABLE cfm.cfg_0_5g_sitelevel;

CREATE TABLE cfm.cfg_0_5g_sitelevel
(
    site_id   varchar NULL,
    site_name varchar NULL,
    area3     varchar NULL
);